From f9478c87f6e8553ce42c5fca91c2fc09f9f50d0f Mon Sep 17 00:00:00 2001
From: Shulhan <ms@kilabit.info>
Date: Sat, 14 Jun 2025 19:21:10 +0700
Subject: brokenlinks: add option "insecure"

The insecure option will allow and not report as error on server with
invalid certificates.
---
 README.adoc | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index f85fa45..b8f79b0 100644
--- a/README.adoc
+++ b/README.adoc
@@ -49,6 +49,9 @@ This command accept the following options,
 `-ignore-status=<comma separated HTTP status code>`::
 List of HTTP status code that will be ignored during scan.
 
+`-insecure`::
+Do not report as error on server with invalid certificates.
+
 `-past-result=<path to JSON file>`::
 Scan only the pages reported by result from past scan based
 on the content in JSON file.
-- 
cgit v1.3

