From f609dc4f7a7cc8b57435696cac1cd0b056f9e8b9 Mon Sep 17 00:00:00 2001
From: Justin Tobler <jltobler@gmail.com>
Date: Mon, 28 Jul 2025 14:42:18 -0500
Subject: builtin: unmark git-switch and git-restore as experimental

In 4e43b7ff (Declare both git-switch and git-restore experimental,
2019-04-25), the newly introduced git-switch(1) and git-restore(1)
commands were marked as experimental. This was done to provide time to
make breaking changes to the interface. It has now been over six years
since these commands were implemented and there hasn't been much change.
Consequently, users have grown to rely on how these commands work and it
is no longer feasible to make any breaking changes.

Let's remove the experimental label for git-switch(1) and
git-restore(1).

Signed-off-by: Justin Tobler <jltobler@gmail.com>
Signed-off-by: Junio C Hamano <gitster@pobox.com>
---
 Documentation/git-switch.adoc | 2 --
 1 file changed, 2 deletions(-)

(limited to 'Documentation/git-switch.adoc')

diff --git a/Documentation/git-switch.adoc b/Documentation/git-switch.adoc
index 9f62abf9e2..87707e9265 100644
--- a/Documentation/git-switch.adoc
+++ b/Documentation/git-switch.adoc
@@ -29,8 +29,6 @@ Switching branches does not require a clean index and working tree
 however if the operation leads to loss of local changes, unless told
 otherwise with `--discard-changes` or `--merge`.
 
-THIS COMMAND IS EXPERIMENTAL. THE BEHAVIOR MAY CHANGE.
-
 OPTIONS
 -------
 _<branch>_::
-- 
cgit v1.3-5-g9baa

