From 03a353bb9759a1c775ba70f1e9ee865fc38291c2 Mon Sep 17 00:00:00 2001
From: Jean-Noël Avila <jn.avila@free.fr>
Date: Mon, 11 Aug 2025 20:53:18 +0000
Subject: doc: check for absence of the form --[no-]parameter
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

For better searchability, this commit adds a check to ensure that parameters
expressed in the form of `--[no-]parameter` are not used in the
documentation.  In the place of such parameters, the documentation should
list two separate parameters: `--parameter` and `--no-parameter`.

Signed-off-by: Jean-Noël Avila <jn.avila@free.fr>
Signed-off-by: Junio C Hamano <gitster@pobox.com>
---
 Documentation/git-range-diff.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'Documentation/git-range-diff.adoc')

diff --git a/Documentation/git-range-diff.adoc b/Documentation/git-range-diff.adoc
index db0e4279b5..b5e85d37f1 100644
--- a/Documentation/git-range-diff.adoc
+++ b/Documentation/git-range-diff.adoc
@@ -96,7 +96,8 @@ diff.
 --remerge-diff::
 	Convenience option, equivalent to `--diff-merges=remerge`.
 
---[no-]notes[=<ref>]::
+--notes[=<ref>]::
+--no-notes::
 	This flag is passed to the `git log` program
 	(see linkgit:git-log[1]) that generates the patches.
 
-- 
cgit v1.3

