From 03a353bb9759a1c775ba70f1e9ee865fc38291c2 Mon Sep 17 00:00:00 2001
From: Jean-Noël Avila <jn.avila@free.fr>
Date: Mon, 11 Aug 2025 20:53:18 +0000
Subject: doc: check for absence of the form --[no-]parameter
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

For better searchability, this commit adds a check to ensure that parameters
expressed in the form of `--[no-]parameter` are not used in the
documentation.  In the place of such parameters, the documentation should
list two separate parameters: `--parameter` and `--no-parameter`.

Signed-off-by: Jean-Noël Avila <jn.avila@free.fr>
Signed-off-by: Junio C Hamano <gitster@pobox.com>
---
 Documentation/git-pack-objects.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'Documentation/git-pack-objects.adoc')

diff --git a/Documentation/git-pack-objects.adoc b/Documentation/git-pack-objects.adoc
index eba014c406..71b9682485 100644
--- a/Documentation/git-pack-objects.adoc
+++ b/Documentation/git-pack-objects.adoc
@@ -243,7 +243,8 @@ depth is 4095.
 	Add --no-reuse-object if you want to force a uniform compression
 	level on all data no matter the source.
 
---[no-]sparse::
+--sparse::
+--no-sparse::
 	Toggle the "sparse" algorithm to determine which objects to include in
 	the pack, when combined with the "--revs" option. This algorithm
 	only walks trees that appear in paths that introduce new objects.
-- 
cgit v1.3

