From fc8a4f15e76ba986707dd0257ed0cc84c009f267 Mon Sep 17 00:00:00 2001
From: Gabriel “gabldotink” <gabl@gabl.ink>
Date: Wed, 18 Mar 2026 15:00:19 -0600
Subject: doc: add missing space on git-config page
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Signed-off-by: Gabriel “gabldotink” <gabl@gabl.ink>
Signed-off-by: Junio C Hamano <gitster@pobox.com>
---
 Documentation/git-config.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'Documentation/git-config.adoc')

diff --git a/Documentation/git-config.adoc b/Documentation/git-config.adoc
index 936e0c5130..7bb28b60ec 100644
--- a/Documentation/git-config.adoc
+++ b/Documentation/git-config.adoc
@@ -213,7 +213,7 @@ See also <<FILES>>.
 +
 Valid `<type>`'s include:
 +
-- 'bool': canonicalize values `true`, `yes`,`on`, and positive
+- 'bool': canonicalize values `true`, `yes`, `on`, and positive
   numbers as "true", and values `false`, `no`, `off` and `0` as
   "false".
 - 'int': canonicalize values as simple decimal numbers. An optional suffix of
-- 
cgit v1.3-6-g1900

