From ba69a6c66d6b349f730bdb3b9e44c3b49dd53e91 Mon Sep 17 00:00:00 2001
From: Junio C Hamano <gitster@pobox.com>
Date: Mon, 12 May 2025 12:03:07 -0700
Subject: doc: prepare for a world without whatchanged

Some documentation examples reference "whatchanged", either as a
placeholder command or an example of source structure.

To reduce the need for future edits when `whatchanged` is removed,
replace these references with alternatives:

 - In `MyFirstObjectWalk.adoc`, use `version` as the nearby anchor
   point for `walken`, instead of `whatchanged`.

 - In `user-manual.adoc`, cite `show` instead of `whatchanged` as
   a command whose source lives in the same file as `log`.

Helped-by: Elijah Newren <newren@gmail.com>
[en: log message]
Signed-off-by: Junio C Hamano <gitster@pobox.com>
---
 Documentation/MyFirstObjectWalk.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'Documentation/MyFirstObjectWalk.adoc')

diff --git a/Documentation/MyFirstObjectWalk.adoc b/Documentation/MyFirstObjectWalk.adoc
index d6e9dfdbbe..102a465a48 100644
--- a/Documentation/MyFirstObjectWalk.adoc
+++ b/Documentation/MyFirstObjectWalk.adoc
@@ -83,13 +83,13 @@ int cmd_walken(int argc, const char **argv, const char *prefix)
 }
 ----
 
-Also add the relevant line in `builtin.h` near `cmd_whatchanged()`:
+Also add the relevant line in `builtin.h` near `cmd_version()`:
 
 ----
 int cmd_walken(int argc, const char **argv, const char *prefix);
 ----
 
-Include the command in `git.c` in `commands[]` near the entry for `whatchanged`,
+Include the command in `git.c` in `commands[]` near the entry for `version`,
 maintaining alphabetical ordering:
 
 ----
-- 
cgit v1.3

